RESTRICTED SERIAL NO. 80

INSTRUCTION BOOK for MODEL LM-6

HETERODYNE RF METER and CRYSTAL CALIBRATOR EQUIPMENT

RANGE 195 to 20,000 KCS

Manufactured for U. S. NAVY DEPARTMENT BUREAU OF SHIPS Contract NOs-72057 Dated 26 February 1940 By BENDIX RADIO CORPORATION BALTIMORE, MARYLAND

I.B. 279

N29.6:C12 - D.H. Hill Library, N. C. State University, Raleigh

Boatanchor On-Line Historical Radio Documentation Edition Entered Into the Boatanchor Archives — 14 June, 1995 By Robert D. Keys/NA4G “Boatanchor Bob”

COPYRIGHT NOTICE

This manual is in the public domain. It was originally printed for the United States government in World War II, and is electronically transcribed for use by all, via the Boatanchor On-Line Historical Radio Documentation Archives. Although the use of the manual was “RESTRICTED” during World War II, it was released after the War in surplus. Original documents can sometimes be found in the National Archives, in University Government Documents Repository Libraries, or in private collections. This particular document was transcribed from an original in the Government Documents Repository Library section of the D. H. Hill Library, North Carolina State University, Raleigh, NC.