
 The SPElling checker is started as:

	>SPE {{listfile}{,newdict}=}{sourcefile}{,dictn,...}{/switches}

 where input files are:

	sourcefile	Contains words to be checked	[default .RNO]
	dictn		Dictionary files		[default .WRD]

 Dictionaries LB:[1,2]SPELL.WRD & SY:SPELL.WRD are used unless /-DD is given.

 Outputs are:

	listfile	Contains all words in source not in dictionary	[.LST]
	newdict		Contains all words in source plus dictionary	[.WRD]

 The default list file is TI:, i.e. all unknown words are shown on the
 terminal. The '=' may then be omitted if there is no newdict.

 Type HELP SPELL SWITCHES for further information.
2 SWITCHES
 General Switches (default /IG:1/EV/GU/LE:132/WI/SP/-IP/-QU):-

	/CC:c{:d}	Change comment character(s) to c {& d}
	/IG:n		Ignore words of <= n letters
	/IU		Ignore words wholly in upper case
	/IP		Ignore embedded punctuation
	/-DD		Default dictionaries are not used
	/EV=/-LO	Every error is printed, none loaded into dictionary
	/QU		Query user before loading each unknown word
	/-GU		Inhibit word guessing
	/HE		Help -- abbreviated form of this text
	/LE:n		Output files are limited to n chars per line
	/WI		Pack 3 errors per line
	/FR:n		Space for >n letters after loading system dictionary
	/UC		Outputs dictionary in upper case
	/SP		Spool differences file

 Language switches to select comments only (default according to f3 filetype):

	/AP = AP120B,	/MA = MACRO,	/PA = Pascal,	/RU = RUNOFF,
	/FO = FORTRAN	/RA = RATFOR,	/RT = RTL2,	/SA = SAL,
	/C = C,		/BC = BCPL,	/TE = text
