Figure #1

Conductive

Pyrogen

Coating

Copper

Insulator

Figure #2

Micro Shorts caused by a dull shear

Figure #3

Flashbulb

Teflon Sheath

Thermalite

3 wraps of tape here

Figure #4

Thermalite with only one wire wrap remaining

Figure #5

Figure #6

Thermalite wire wrapping tool

(not to scale)

Figure #7

Igniter wire wrapping tool

Figure #9

Figure #10

Figure #12

Figure #8

1/81/81/8For large throats

1/81/81/8For small throats

Figure #11

Cut here

Don’t wrap over oxidation here